INSERT INTO os_images (id, template_image_file_name, description, deprecated)
VALUES  ('guixsystem120', 'guixsystem/1.2.0/root.img.qcow2', 'Guix System 1.2.0', FALSE);

UPDATE schemaversion SET version = 10;
