DELETE FROM os_images WHERE id = 'openbsd68';
DELETE FROM os_images WHERE id = 'alpine312';

UPDATE os_images SET deprecated = FALSE WHERE id =  'openbsd67';
UPDATE os_images SET deprecated = FALSE WHERE id =  'alpine311';

UPDATE os_images SET template_image_file_name = 'alpine311.img'
WHERE id = 'alpine311';

UPDATE os_images SET template_image_file_name = 'ubuntu-18.04-minimal-cloudimg-amd64.img'
WHERE id = 'ubuntu18';

UPDATE os_images SET template_image_file_name = 'openbsd-cloud-2020-05.qcow2'
WHERE id = 'openbsd66';

UPDATE os_images SET template_image_file_name = 'openbsd67.img'
WHERE id = 'openbsd67';

UPDATE os_images SET template_image_file_name = 'ubuntu20.img'
WHERE id = 'ubuntu20';

UPDATE os_images SET template_image_file_name = 'debian10.img'
WHERE id = 'debian10';

UPDATE os_images SET template_image_file_name = 'centos7.img'
WHERE id = 'centos7';

UPDATE os_images SET template_image_file_name = 'centos8.img'
WHERE id = 'centos8';

UPDATE os_images SET template_image_file_name = 'guixsystem-cloud-2020-05.qcow2'
WHERE id = 'guix110';

UPDATE schemaversion SET version = 7;
